
<script>
  import { backendUiStore } from "builderStore"
  import { DropdownMenu, Button, Icon, Input, Select } from "@budibase/bbui"
  import { FIELDS } from "constants/backend"
  import CreateEditColumnPopover from "./CreateEditColumnPopover.svelte"
  import ConfirmDialog from "components/common/ConfirmDialog.svelte"
  import { notifier } from "../../../../builderStore/store/notifications"

  export let field

  let anchor
  let dropdown
  let editing
  let confirmDeleteDialog

  $: sortColumn = $backendUiStore.sort && $backendUiStore.sort.column
  $: sortDirection = $backendUiStore.sort && $backendUiStore.sort.direction
  $: type = field?.type

  function showEditor() {
    editing = true
  }

  function hideEditor() {
    dropdown.hide()
    editing = false
  }

  function showDelete() {
    dropdown.hide()
    confirmDeleteDialog.show()
  }

  function deleteColumn() {
    if (field.name === $backendUiStore.selectedTable.primaryDisplay) {
      notifier.danger("You cannot delete the display column")
    } else {
      backendUiStore.actions.tables.deleteField(field)
      notifier.success("Column deleted")
    }
    hideEditor()
  }

  function sort(direction, column) {
    backendUiStore.update(state => {
      if (direction !== "none") {
        state.sort = { direction, column }
      } else {
        state.sort = undefined
      }
      return state
    })
    hideEditor()
  }
</script>

<div class="container" bind:this={anchor} on:click={dropdown.show}>
  <span>{field.name}</span>
  <Icon name="arrowdown" />
</div>
<DropdownMenu bind:this={dropdown} {anchor} align="left">
  {#if editing}
    <h5>Edit Column</h5>
    <CreateEditColumnPopover onClosed={hideEditor} {field} />
  {:else}
    <ul>
      {#if type !== 'link'}
        <li data-cy="edit-column-header" on:click={showEditor}>
          <Icon name="edit" />
          Edit
        </li>
      {/if}
      <li data-cy="delete-column-header" on:click={showDelete}>
        <Icon name="delete" />
        Delete
      </li>
      {#if sortDirection === 'desc' || sortDirection === 'asc'}
        <li on:click={() => sort('none', field.name)}>
          <Icon name="close" />
          Remove sort
        </li>
      {/if}
      {#if sortDirection === 'desc' || sortColumn !== field.name}
        <li on:click={() => sort('asc', field.name)}>
          <Icon name="sortascending" />
          Sort A - Z
        </li>
      {/if}
      {#if sortDirection === 'asc' || sortColumn !== field.name}
        <li on:click={() => sort('desc', field.name)}>
          <Icon name="sortdescending" />
          Sort Z - A
        </li>
      {/if}
    </ul>
  {/if}
</DropdownMenu>
<ConfirmDialog
  bind:this={confirmDeleteDialog}
  body={`Are you sure you wish to delete this column? Your data will be deleted and this action cannot be undone.`}
  okText="Delete Column"
  onOk={deleteColumn}
  title="Confirm Delete" />

<style>
  .container {
    display: flex;
    flex-direction: row;
    justify-content: flex-start;
    align-items: center;
    gap: var(--spacing-xs);
  }

  h5 {
    padding: var(--spacing-xl) 0 0 var(--spacing-xl);
    margin: 0;
    font-weight: 500;
  }

  ul {
    list-style: none;
    padding-left: 0;
    margin: 0;
    padding: var(--spacing-s) 0;
  }

  li {
    display: flex;
    font-family: var(--font-sans);
    font-size: var(--font-size-xs);
    color: var(--ink);
    padding: var(--spacing-s) var(--spacing-m);
    margin: auto 0px;
    align-items: center;
    cursor: pointer;
  }

  li:hover {
    background-color: var(--grey-2);
  }

  li:active {
    color: var(--blue);
  }
</style>
